---
title: AB Test
icon: vials
---

The AB Test block allows you to split the path in 2 randomly. It's great way to test the performance of 2 different paths.

<Frame>
  <img src="/images/blocks/logic/abTest.png" alt="AB Test block" />
</Frame>

## More than 2 paths

You can stack multiple AB test blocks to add more random paths

<Frame>
  <img
    src="/images/blocks/logic/abTestMulti.png"
    alt="AB Test block multiple paths"
  />
</Frame>
